View Mode Selector Field (1.0.0-rc5) - en to unknown language translation catalogue (6 entries)

en: Value
target: Valor

en: Custom
target: Personalizado

en: General
target: Geral

en: Default value
target: Valor padrão

en: Text value
target: Valor de texto

en: View Mode Selector
target: Seletor de modo de visualização
