jQuery-viewport-checker (8.x-1.4) - en to unknown language translation catalogue (6 entries)

en: Pages
target: 頁面

en: Development
target: 開發

en: Not installed
target: 未安裝

en: Installed
target: 已安裝

en: Show for the listed pages
target: 為下列頁面顯示

en: Hide for the listed pages
target: 為下列頁面隱藏
