jQuery-viewport-checker (8.x-1.5) - en to unknown language translation catalogue (4 entries)

en: Pages
target: 頁面

en: Development
target: 開發

en: Show for the listed pages
target: 為下列頁面顯示

en: Hide for the listed pages
target: 為下列頁面隱藏
